The LOBSTER x-ray

all-sky monitor consortium

Los Alamos National Laboratory

                         Management

                         Detector readout electronics?

                         Spacecraft, ground station, flight operations, integration, and test

                         Analysis software lead?

Goddard Space Flight Center

                         Detectors and front-end electronics

                         Analog and digital electronics

                         Analysis software lead?

University of Melbourne, Australia

                         X-ray optics, coatings, and modeling

                         Ground site

Leicester University, United Kingdom

                         X-ray optics and coatings

                         Lens assembly, alignment, and calibration

The LODESTAR Collaboration

                         Educational outreach

                                                              All participants share in analysis software and science