Large Magellenic

Cloud - Simulated

Images

In a 1-day exposure, sources are visible to the expected limit of 2 x 10 -12  erg cm -2  s -1  (0.5-3.5 keV).

The angular resolution of about 4 arc-minutes corresponds to 400
m
m on the detector. The left

picture shows a simulated 1-day exposure; the right, a simulated 10-day exposure.